/*
 Navicat Premium Data Transfer

 Source Server         : localhost MySQL 8.0
 Source Server Type    : MySQL
 Source Server Version : 80012
 Source Host           : localhost:3306
 Source Schema         : epp

 Target Server Type    : MySQL
 Target Server Version : 80012
 File Encoding         : 65001

 Date: 21/10/2022 01:13:14
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

SET FOREIGN_KEY_CHECKS = 1;
